
  The Restaurant Database program is currently
handling an error condition.  The error message
has been printed on your screen as descriptively
as possible.  Please follow the instructions in
that error message.

  If you need help beyond what is provided here,
please call our Helpline at 617-674-2359 during
regular business hours, and we will be happy to
assist you.


END OF FILE - HIT ESCAPE KEY TO EXIT
